+Redshift: float32 +Error: float32 +Confidence: float32

Redshift

+Peak shift: float32 +Tonry & Davis R Value: float32 +Height: float32 +Width: float32 +Error on peak: float32 +RMS of CCF: float32 +Peak Number: int16 +Template ID: int16

Absorption Line Redshift

+Number of matched lines: int16 +Number of unmatched lines: int16 +Degenerate flag: int16

Emission Line Redshift

+Line center: float32 +Error in line center: float32 +Minimum wavelen of line influence: float32 +Maximum wavelen of lline influence: float32 +Sigma of fitted Gaussian: float32 +Sigma error: float32 +Height of Gaussian: float32 +Height error: float32 +Continuum at this pixel: float32 +Equivalent width: float32 +Equivalent width error: float32 +Spectral index: float32 +Significance of line in sigma: float32 +Chi-squared of fit: float32 +Degrees of freedom: int32 +Integer ID: int32 +Redshift: float32 +Redshift error: float32 +line Mask: uint32

Emission Line

+name: char +Equivalent width: float32 +Equivalent width error: float32 +Magnitude of index: float32 +Magnitude error: float32 +Minimum wavelength (rest): float32 +Maximum wavelength (rest): float32 +Redshift: float32 +Signal To Noise: float32

Spectrum Line Index

Spectral Line Data

Page 1